en	External authentication For users that have no Peertube account, you can enable various authentication modes based on remote authentication providers.

en	OpenID Connect

en	Use an OpenID Connect provider

en	You can configure an external OpenID Connect provider that could be used to log in to the chat. Please refer to the documentation: Settings.

en	Label for the connection button

en	This label will be displayed to users, as the button label to authenticate with this OIDC provider.

en	Discovery URL

en	Client ID

en	Client secret

en	Callback/Redirect URI: If you want to configure authorized redirection URI on the external Application, please add this url:

en	Use Google

en	Enabling this adds a "login with Google" button. You have to configure a Google OAuth application.

en	Use Facebook

en	Enabling this adds a "login with Facebook" button. You have to configure a Facebook OAuth application.

en	Your browser has blocked the opening on the remote instance, please try to open manually this link:

en	Authentication failed

en	Tasks

en	Create new task list:

en	Error when saving the task list

en	Task list name

en	Delete task list

en	Are you sure you want to delete this task list?

en	Create a new task

en	Task name

en	Description

en	Delete task

en	Are you sure you want to delete this task?

en	Please choose a task list

en	There is no task list for now, please first create one

en	Once you have chosen a task list, a new task will be created. To see the task, open the task application using the top menu. More information in the livechat plugin documentation.